\begin{tabular}
Time&Oxygen 18 isotopic ratio\\
YEAR A.D.&per mil\\
1984.0&-19.93\\
1983.0&-14.11\\
1982.0&-19.99\\
1981.0&-17.58\\
1980.0&-15.65\\
1979.0&-17.42\\
1978.0&-17.36\\
1977.0&-17.89\\
1976.0&-17.82\\
1975.0&-18.76\\
1974.0&-18.99\\
1973.0&-19.49\\
1972.0&-18.8\\
1971.0&-19.15\\
1970.0&-19.13\\
1969.0&-16.43\\
1968.0&-15.74\\
1967.0&-16.44\\
1966.0&-16.17\\
1965.0&-16.28\\
1964.0&-16.46\\
1963.0&-16.95\\
1962.0&-18.05\\
1961.0&-17.87\\
1960.0&-17.15\\
1959.0&-18.25\\
1958.0&-15.74\\
1957.0&-16.23\\
1956.0&-16.12\\
1955.0&-17.73\\
1954.0&-18.65\\
1953.0&-19.77\\
1952.0&-18.76\\
1951.0&-18.99\\
1950.0&-19.08\\
1949.0&-18.52\\
1948.0&-17.96\\
1947.0&-16.77\\
1946.0&-18.38\\
1945.0&-18.55\\
1944.0&-15.48\\
1943.0&-17.26\\
1942.0&-15.9\\
1941.0&-15.46\\
1940.0&-14.27\\
1939.0&-15.53\\
1938.0&-16.0\\
1937.0&-15.56\\
1936.0&-15.48\\
1935.0&-16.48\\
1934.0&-18.46\\
1933.0&-19.03\\
1932.0&-19.07\\
1931.0&-18.92\\
1930.0&-17.54\\
1929.0&-18.02\\
1928.0&-16.9\\
1927.0&-17.47\\
1926.0&-16.11\\
1925.0&-15.96\\
1924.0&-16.94\\
1923.0&-17.14\\
1922.0&-18.78\\
1921.0&-20.19\\
1920.0&-19.58\\
1919.0&-17.85\\
1918.0&-18.28\\
1917.0&-19.09\\
1916.0&-18.6\\
1915.0&-17.29\\
1914.0&-15.78\\
1913.0&-17.33\\
1912.0&-16.74\\
1911.0&-18.04\\
1910.0&-20.0\\
1909.0&-19.33\\
1908.0&-19.7\\
1907.0&-18.24\\
1906.0&-15.2\\
1905.0&-14.82\\
1904.0&-18.7\\
1903.0&-19.03\\
1902.0&-17.22\\
1901.0&-15.33\\
1900.0&-16.59\\
1899.0&-18.5\\
1898.0&-18.68\\
1897.0&-17.64\\
1896.0&-16.99\\
1895.0&-19.17\\
1894.0&-20.33\\
1893.0&-20.28\\
1892.0&-18.19\\
1891.0&-18.69\\
1890.0&-18.91\\
1889.0&-18.6\\
1888.0&-16.99\\
1887.0&-16.92\\
1886.0&-18.81\\
1885.0&-18.97\\
1884.0&-19.43\\
1883.0&-18.11\\
1882.0&-18.24\\
1881.0&-16.55\\
1880.0&-17.88\\
1879.0&-17.96\\
1878.0&-15.62\\
1877.0&-19.01\\
1876.0&-18.5\\
1875.0&-20.15\\
1874.0&-20.05\\
1873.0&-19.09\\
1872.0&-19.34\\
1871.0&-20.15\\
1870.0&-19.07\\
1869.0&-18.07\\
1868.0&-20.28\\
1867.0&-19.45\\
1866.0&-14.51\\
1865.0&-17.33\\
1864.0&-20.47\\
1863.0&-18.23\\
1862.0&-16.98\\
1861.0&-20.28\\
1860.0&-19.41\\
1859.0&-18.51\\
1858.0&-18.98\\
1857.0&-17.58\\
1856.0&-16.66\\
1855.0&-17.38\\
1854.0&-18.36\\
1853.0&-19.29\\
1852.0&-17.57\\
1851.0&-19.69\\
1850.0&-18.55\\
1849.0&-19.49\\
1848.0&-19.29\\
1847.0&-15.57\\
1846.0&-18.38\\
1845.0&-17.3\\
1844.0&-17.12\\
1843.0&-18.41\\
1842.0&-18.78\\
1841.0&-16.8\\
1840.0&-17.54\\
1839.0&-17.78\\
1838.0&-19.13\\
1837.0&-19.21\\
1836.0&-17.73\\
1835.0&-18.72\\
1834.0&-16.83\\
1833.0&-18.41\\
1832.0&-18.13\\
1831.0&-19.32\\
1830.0&-17.71\\
1829.0&-16.46\\
1828.0&-17.4\\
1827.0&-16.4\\
1826.0&-14.85\\
1825.0&-19.35\\
1824.0&-18.73\\
1823.0&-19.54\\
1822.0&-18.61\\
1821.0&-17.46\\
1820.0&-22.22\\
1819.0&-19.93\\
1818.0&-20.55\\
1817.0&-20.69\\
1816.0&-21.57\\
1815.0&-19.52\\
1814.0&-19.64\\
1813.0&-19.68\\
1812.0&-18.43\\
1811.0&-19.18\\
1810.0&-20.76\\
1809.0&-18.95\\
1808.0&-19.43\\
1807.0&-20.35\\
1806.0&-16.66\\
1805.0&-16.95\\
1804.0&-18.49\\
1803.0&-20.38\\
1802.0&-18.52\\
1801.0&-17.24\\
1800.0&-18.74\\
1799.0&-19.55\\
1798.0&-20.74\\
1797.0&-18.14\\
1796.0&-17.69\\
1795.0&-17.19\\
1794.0&-16.02\\
1793.0&-16.97\\
1792.0&-18.24\\
1791.0&-19.71\\
1790.0&-19.81\\
1789.0&-18.19\\
1788.0&-19.4\\
1787.0&-19.9\\
1786.0&-19.57\\
1785.0&-15.4\\
1784.0&-18.3\\
1783.0&-19.29\\
1782.0&-17.74\\
1781.0&-19.38\\
1780.0&-22.18\\
1779.0&-19.14\\
1778.0&-18.5\\
1777.0&-20.74\\
1776.0&-20.49\\
1775.0&-17.82\\
1774.0&-18.03\\
1773.0&-19.12\\
1772.0&-15.94\\
1771.0&-18.85\\
1770.0&-18.52\\
1769.0&-21.15\\
1768.0&-18.01\\
1767.0&-15.47\\
1766.0&-19.23\\
1765.0&-19.36\\
1764.0&-18.37\\
1763.0&-18.39\\
1762.0&-19.62\\
1761.0&-18.11\\
1760.0&-18.95\\
1759.0&-19.87\\
1758.0&-21.81\\
1757.0&-20.28\\
1756.0&-18.99\\
1755.0&-18.96\\
1754.0&-19.32\\
1753.0&-19.11\\
1752.0&-18.79\\
1751.0&-17.85\\
1750.0&-18.49\\
1749.0&-17.56\\
1748.0&-14.91\\
1747.0&-19.46\\
1746.0&-21.07\\
1745.0&-18.94\\
1744.0&-19.62\\
1743.0&-21.44\\
1742.0&-19.3\\
1741.0&-16.57\\
1740.0&-17.22\\
1739.0&-17.94\\
1738.0&-17.28\\
1737.0&-19.05\\
1736.0&-19.33\\
1735.0&-18.72\\
1734.0&-20.52\\
1733.0&-19.08\\
1732.0&-22.9\\
1731.0&-19.53\\
1730.0&-19.49\\
1729.0&-15.61\\
1728.0&-17.93\\
1727.0&-19.86\\
1726.0&-19.81\\
1725.0&-21.65\\
1724.0&-14.7\\
1723.0&-15.35\\
1722.0&-17.22\\
1721.0&-19.11\\
1720.0&-17.24\\
1719.0&-18.48\\
1718.0&-19.42\\
1717.0&-19.88\\
1716.0&-21.23\\
1715.0&-18.82\\
1714.0&-19.29\\
1713.0&-15.89\\
1712.0&-17.04\\
1711.0&-17.62\\
1710.0&-17.72\\
1709.0&-15.69\\
1708.0&-20.35\\
1707.0&-18.04\\
1706.0&-17.46\\
1705.0&-20.3\\
1704.0&-19.81\\
1703.0&-19.47\\
1702.0&-18.63\\
1701.0&-20.46\\
1700.0&-17.95\\
1699.0&-19.53\\
1698.0&-21.57\\
1697.0&-19.43\\
1696.0&-18.82\\
1695.0&-17.66\\
1694.0&-16.72\\
1693.0&-17.8\\
1692.0&-20.26\\
1691.0&-16.42\\
1690.0&-20.44\\
1689.0&-21.67\\
1688.0&-16.84\\
1687.0&-16.51\\
1686.0&-20.09\\
1685.0&-19.54\\
1684.0&-17.81\\
1683.0&-19.24\\
1682.0&-16.88\\
1681.0&-19.2\\
1680.0&-19.55\\
1679.0&-19.33\\
1678.0&-20.66\\
1677.0&-18.58\\
1676.0&-18.84\\
1675.0&-18.8\\
1674.0&-20.05\\
1673.0&-19.56\\
1672.0&-19.16\\
1671.0&-17.33\\
1670.0&-19.59\\
1669.0&-19.09\\
1668.0&-19.12\\
1667.0&-19.62\\
1666.0&-18.41\\
1665.0&-22.73\\
1664.0&-19.95\\
1663.0&-20.36\\
1662.0&-15.94\\
1661.0&-18.41\\
1660.0&-19.94\\
1659.0&-17.75\\
1658.0&-17.37\\
1657.0&-14.17\\
1656.0&-16.79\\
1655.0&-18.64\\
1654.0&-19.46\\
1653.0&-18.59\\
1652.0&-16.24\\
1651.0&-20.13\\
1650.0&-18.32\\
1649.0&-18.16\\
1648.0&-16.09\\
1647.0&-16.63\\
1646.0&-17.55\\
1645.0&-17.61\\
1644.0&-20.23\\
1643.0&-19.05\\
1642.0&-22.39\\
1641.0&-19.77\\
1640.0&-17.29\\
1639.0&-19.52\\
1638.0&-19.72\\
1637.0&-17.61\\
1636.0&-13.81\\
1635.0&-16.35\\
1634.0&-17.89\\
1633.0&-17.94\\
1632.0&-19.15\\
1631.0&-20.65\\
1630.0&-19.42\\
1629.0&-20.01\\
1628.0&-20.89\\
1627.0&-19.65\\
1626.0&-20.24\\
1625.0&-18.22\\
1624.0&-17.04\\
1623.0&-19.61\\
1622.0&-18.91\\
1621.0&-17.79\\
1620.0&-17.36\\
1619.0&-17.26\\
1618.0&-18.58\\
1617.0&-18.95\\
1616.0&-18.49\\
1615.0&-18.49\\
1614.0&-19.05\\
1613.0&-18.35\\
1612.0&-18.15\\
1611.0&-19.75\\
1610.0&-18.3\\
1609.0&-17.21\\
1608.0&-17.17\\
1607.0&-16.81\\
1606.0&-18.57\\
1605.0&-19.46\\
1604.0&-19.32\\
1603.0&-20.47\\
1602.0&-20.92\\
1601.0&-20.81\\
1600.0&-18.77\\
1599.0&-18.97\\
1598.0&-18.31\\
1597.0&-18.18\\
1596.0&-17.02\\
1595.0&-16.65\\
1594.0&-17.0\\
1593.0&-17.36\\
1592.0&-17.92\\
1591.0&-18.16\\
1590.0&-18.36\\
1589.0&-18.88\\
1588.0&-19.35\\
1587.0&-19.24\\
1586.0&-19.79\\
1585.0&-17.38\\
1584.0&-15.36\\
1583.0&-17.82\\
1582.0&-18.16\\
1581.0&-19.19\\
1580.0&-17.64\\
1579.0&-18.35\\
1578.0&-22.17\\
1577.0&-18.29\\
1576.0&-20.05\\
1575.0&-18.94\\
1574.0&-17.3\\
1573.0&-20.58\\
1572.0&-21.13\\
1571.0&-16.43\\
1570.0&-18.32\\
1569.0&-20.85\\
1568.0&-19.17\\
1567.0&-19.48\\
1566.0&-13.88\\
1565.0&-17.93\\
1564.0&-16.98\\
1563.0&-18.15\\
1562.0&-20.27\\
1561.0&-18.06\\
1560.0&-20.23\\
1559.0&-18.15\\
1558.0&-19.45\\
1557.0&-17.42\\
1556.0&-18.41\\
1555.0&-17.41\\
1554.0&-17.87\\
1553.0&-21.06\\
1552.0&-17.31\\
1551.0&-17.99\\
1550.0&-18.63\\
1549.0&-19.57\\
1548.0&-19.25\\
1547.0&-18.08\\
1546.0&-17.15\\
1545.0&-19.63\\
1544.0&-18.21\\
1543.0&-18.56\\
1542.0&-18.02\\
1541.0&-19.46\\
1540.0&-18.65\\
1539.0&-17.02\\
1538.0&-18.31\\
1537.0&-17.25\\
1536.0&-18.33\\
1535.0&-18.79\\
1534.0&-16.72\\
1533.0&-19.15\\
1532.0&-18.58\\
1531.0&-14.27\\
1530.0&-17.3\\
1529.0&-19.81\\
1528.0&-17.41\\
1527.0&-16.08\\
1526.0&-16.75\\
1525.0&-18.3\\
1524.0&-17.33\\
1523.0&-17.44\\
1522.0&-18.24\\
1521.0&-15.05\\
1520.0&-15.94\\
1519.0&-19.61\\
1518.0&-19.12\\
1517.0&-18.01\\
1516.0&-18.24\\
1515.0&-18.42\\
1514.0&-19.39\\
1513.0&-19.05\\
1512.0&-17.68\\
1511.0&-16.32\\
1510.0&-17.77\\
1509.0&-17.37\\
1508.0&-17.29\\
1507.0&-18.13\\
1506.0&-16.8\\
1505.0&-16.94\\
1504.0&-20.43\\
1503.0&-20.26\\
1502.0&-19.2\\
1501.0&-16.3\\
1500.0&-17.82\\
1499.0&-19.04\\
1498.0&-18.22\\
1497.0&-18.66\\
1496.0&-18.77\\
1495.0&-17.49\\
1494.0&-17.35\\
1493.0&-16.33\\
1492.0&-17.49\\
1491.0&-16.05\\
1490.0&-17.66\\
1489.0&-17.48\\
1488.0&-16.92\\
1487.0&-17.21\\
1486.0&-16.99\\
1485.0&-17.86\\
1484.0&-18.42\\
1483.0&-18.57\\
1482.0&-17.71\\
1481.0&-18.57\\
1480.0&-17.36\\
1479.0&-17.4\\
1478.0&-18.53\\
1477.0&-18.67\\
1476.0&-19.21\\
1475.0&-19.26\\
1474.0&-17.53\\
1473.0&-18.54\\
1472.0&-19.05\\
1471.0&-18.67\\
1470.0&-17.99\\
1469.0&-18.41\\
1468.0&-19.24\\
1467.0&-17.18\\
1466.0&-18.73\\
1465.0&-18.07\\
1464.0&-18.4\\
1463.0&-18.57\\
1462.0&-17.76\\
1461.0&-17.77\\
1460.0&-17.26\\
1459.0&-17.65\\
1458.0&-19.2\\
1457.0&-18.56\\
1456.0&-21.58\\
1455.0&-19.72\\
1454.0&-20.11\\
1453.0&-17.76\\
1452.0&-16.49\\
1451.0&-16.12\\
1450.0&-17.47\\
1449.0&-17.27\\
1448.0&-17.24\\
1447.0&-18.11\\
1446.0&-18.27\\
1445.0&-19.25\\
1444.0&-17.71\\
1443.0&-15.92\\
1442.0&-16.47\\
1441.0&-16.48\\
1440.0&-17.93\\
1439.0&-18.79\\
1438.0&-19.3\\
1437.0&-17.67\\
1436.0&-20.56\\
1435.0&-19.6\\
1434.0&-18.33\\
1433.0&-16.54\\
1432.0&-16.86\\
1431.0&-17.84\\
1430.0&-18.75\\
1429.0&-17.9\\
1428.0&-17.31\\
1427.0&-17.75\\
1426.0&-16.27\\
1425.0&-18.14\\
1424.0&-19.15\\
1423.0&-18.68\\
1422.0&-19.55\\
1421.0&-18.21\\
1420.0&-17.37\\
1419.0&-18.51\\
1418.0&-18.82\\
1417.0&-16.91\\
1416.0&-18.37\\
1415.0&-18.37\\
1414.0&-18.38\\
1413.0&-15.4\\
1412.0&-17.22\\
1411.0&-16.97\\
1410.0&-17.43\\
1409.0&-17.61\\
1408.0&-18.94\\
1407.0&-18.32\\
1406.0&-17.42\\
1405.0&-17.45\\
1404.0&-17.25\\
1403.0&-17.39\\
1402.0&-17.08\\
1401.0&-17.6\\
1400.0&-18.4\\
1399.0&-18.76\\
1398.0&-18.67\\
1397.0&-19.56\\
1396.0&-18.51\\
1395.0&-17.28\\
1394.0&-17.97\\
1393.0&-17.8\\
1392.0&-17.58\\
1391.0&-19.83\\
1390.0&-17.87\\
1389.0&-18.16\\
1388.0&-17.93\\
1387.0&-18.54\\
1386.0&-18.64\\
1385.0&-18.81\\
1384.0&-19.47\\
1383.0&-16.56\\
1382.0&-16.69\\
1381.0&-17.32\\
1380.0&-17.74\\
1379.0&-16.74\\
1378.0&-19.07\\
1377.0&-16.44\\
1376.0&-15.9\\
1375.0&-17.89\\
1374.0&-18.62\\
1373.0&-16.78\\
1372.0&-16.38\\
1371.0&-16.85\\
1370.0&-15.81\\
1369.0&-19.29\\
1368.0&-17.07\\
1367.0&-16.57\\
1366.0&-16.57\\
1365.0&-16.49\\
1364.0&-16.71\\
1363.0&-17.37\\
1362.0&-15.64\\
1361.0&-15.67\\
1360.0&-17.57\\
1359.0&-16.86\\
1358.0&-16.86\\
1357.0&-16.32\\
1356.0&-15.78\\
1355.0&-16.78\\
1354.0&-17.15\\
1353.0&-18.12\\
1352.0&-18.12\\
1351.0&-18.88\\
1350.0&-19.18\\
1349.0&-20.01\\
1348.0&-17.4\\
1347.0&-17.14\\
1346.0&-17.14\\
1345.0&-17.75\\
1344.0&-17.98\\
1343.0&-17.98\\
1342.0&-19.64\\
1341.0&-21.24\\
1340.0&-21.13\\
1339.0&-18.16\\
1338.0&-17.28\\
1337.0&-14.88\\
1336.0&-14.51\\
1335.0&-17.32\\
1334.0&-17.28\\
1333.0&-17.56\\
1332.0&-16.83\\
1331.0&-16.83\\
1330.0&-18.03\\
1329.0&-18.27\\
1328.0&-17.91\\
1327.0&-19.6\\
1326.0&-16.86\\
1325.0&-16.86\\
1324.0&-16.38\\
1323.0&-17.21\\
1322.0&-16.56\\
1321.0&-16.56\\
1320.0&-17.49\\
1319.0&-17.44\\
1318.0&-17.44\\
1317.0&-16.81\\
1316.0&-16.36\\
1315.0&-16.17\\
1314.0&-16.17\\
1313.0&-18.85\\
1312.0&-16.79\\
1311.0&-16.79\\
1310.0&-16.65\\
1309.0&-18.51\\
1308.0&-18.44\\
1307.0&-18.2\\
1306.0&-16.68\\
1305.0&-15.85\\
1304.0&-18.03\\
1303.0&-17.29\\
1302.0&-17.41\\
1301.0&-17.4\\
1300.0&-18.1\\
1299.0&-18.82\\
1298.0&-19.08\\
1297.0&-18.68\\
1296.0&-19.5\\
1295.0&-19.48\\
1294.0&-18.75\\
1293.0&-18.3\\
1292.0&-17.44\\
1291.0&-17.44\\
1290.0&-17.36\\
1289.0&-17.76\\
1288.0&-17.59\\
1287.0&-18.06\\
1286.0&-19.55\\
1285.0&-18.91\\
1284.0&-17.93\\
1283.0&-18.14\\
1282.0&-18.14\\
1281.0&-19.19\\
1280.0&-20.74\\
1279.0&-18.21\\
1278.0&-15.44\\
1277.0&-16.22\\
1276.0&-16.17\\
1275.0&-14.46\\
1274.0&-17.07\\
1273.0&-16.73\\
1272.0&-16.73\\
1271.0&-17.96\\
1270.0&-18.38\\
1269.0&-17.24\\
1268.0&-18.32\\
1267.0&-18.87\\
1266.0&-19.87\\
1265.0&-19.3\\
1264.0&-17.89\\
1263.0&-18.97\\
1262.0&-20.02\\
1261.0&-18.35\\
1260.0&-18.37\\
1259.0&-16.79\\
1258.0&-17.95\\
1257.0&-19.4\\
1256.0&-19.17\\
1255.0&-19.05\\
1254.0&-18.23\\
1253.0&-14.74\\
1252.0&-16.25\\
1251.0&-17.31\\
1250.0&-17.32\\
1249.0&-15.99\\
1248.0&-16.6\\
1247.0&-17.19\\
1246.0&-16.62\\
1245.0&-17.66\\
1244.0&-18.32\\
1243.0&-16.31\\
1242.0&-14.76\\
1241.0&-17.56\\
1240.0&-17.56\\
1239.0&-18.44\\
1238.0&-18.84\\
1237.0&-20.38\\
1236.0&-20.27\\
1235.0&-19.53\\
1234.0&-16.94\\
1233.0&-18.42\\
1232.0&-19.52\\
1231.0&-17.76\\
1230.0&-17.76\\
1229.0&-16.96\\
1228.0&-16.43\\
1227.0&-18.04\\
1226.0&-18.14\\
1225.0&-18.14\\
1224.0&-18.46\\
1223.0&-16.16\\
1222.0&-17.49\\
1221.0&-18.57\\
1220.0&-18.57\\
1219.0&-18.82\\
1218.0&-17.44\\
1217.0&-17.81\\
1216.0&-17.81\\
1215.0&-16.35\\
1214.0&-13.85\\
1213.0&-14.51\\
1212.0&-17.47\\
1211.0&-18.34\\
1210.0&-17.65\\
1209.0&-18.54\\
1208.0&-19.41\\
1207.0&-19.41\\
1206.0&-20.57\\
1205.0&-17.61\\
1204.0&-15.55\\
1203.0&-15.55\\
1202.0&-18.44\\
1201.0&-19.49\\
1200.0&-19.1\\
1199.0&-17.68\\
1198.0&-16.24\\
1197.0&-19.55\\
1196.0&-18.97\\
1195.0&-17.85\\
1194.0&-16.7\\
1193.0&-18.66\\
1192.0&-18.59\\
1191.0&-18.23\\
1190.0&-17.35\\
1189.0&-17.35\\
1188.0&-17.41\\
1187.0&-18.93\\
1186.0&-18.76\\
1185.0&-18.79\\
1184.0&-18.17\\
1183.0&-18.17\\
1182.0&-18.56\\
1181.0&-16.8\\
1180.0&-18.17\\
1179.0&-18.4\\
1178.0&-19.61\\
1177.0&-19.7\\
1176.0&-18.22\\
1175.0&-17.7\\
1174.0&-17.56\\
1173.0&-17.56\\
1172.0&-17.13\\
1171.0&-17.16\\
1170.0&-18.32\\
1169.0&-17.15\\
1168.0&-17.05\\
1167.0&-16.96\\
1166.0&-16.59\\
1165.0&-17.07\\
1164.0&-16.65\\
1163.0&-20.5\\
1162.0&-20.37\\
1161.0&-20.24\\
1160.0&-19.04\\
1159.0&-17.57\\
1158.0&-15.97\\
1157.0&-15.97\\
1156.0&-16.83\\
1155.0&-18.15\\
1154.0&-17.26\\
1153.0&-17.95\\
1152.0&-17.95\\
1151.0&-17.67\\
1150.0&-17.35\\
1149.0&-17.35\\
1148.0&-18.47\\
1147.0&-18.48\\
1146.0&-18.32\\
1145.0&-18.32\\
1144.0&-18.53\\
1143.0&-18.8\\
1142.0&-17.78\\
1141.0&-16.9\\
1140.0&-16.9\\
1139.0&-18.67\\
1138.0&-18.67\\
1137.0&-18.78\\
1136.0&-18.78\\
1135.0&-18.57\\
1134.0&-18.57\\
1133.0&-17.99\\
1132.0&-17.99\\
1131.0&-17.58\\
1130.0&-16.14\\
1129.0&-16.14\\
1128.0&-16.12\\
1127.0&-16.12\\
1126.0&-17.09\\
1125.0&-18.5\\
1124.0&-15.41\\
1123.0&-17.84\\
1122.0&-17.84\\
1121.0&-17.59\\
1120.0&-17.04\\
1119.0&-17.04\\
1118.0&-17.04\\
1117.0&-16.8\\
1116.0&-16.8\\
1115.0&-17.43\\
1114.0&-17.72\\
1113.0&-17.72\\
1112.0&-18.41\\
1111.0&-18.41\\
1110.0&-18.37\\
1109.0&-16.74\\
1108.0&-16.74\\
1107.0&-18.22\\
1106.0&-18.22\\
1105.0&-18.67\\
1104.0&-18.67\\
1103.0&-18.67\\
1102.0&-17.66\\
1101.0&-17.66\\
1100.0&-18.2\\
1099.0&-18.2\\
1098.0&-19.17\\
1097.0&-19.17\\
1096.0&-16.51\\
1095.0&-16.51\\
1094.0&-18.22\\
1093.0&-18.22\\
1092.0&-16.87\\
1091.0&-16.87\\
1090.0&-16.27\\
1089.0&-16.27\\
1088.0&-18.54\\
1087.0&-18.54\\
1086.0&-18.22\\
1085.0&-18.22\\
1084.0&-16.69\\
1083.0&-17.02\\
1082.0&-17.02\\
1081.0&-17.2\\
1080.0&-17.2\\
1079.0&-16.63\\
1078.0&-15.8\\
1077.0&-15.8\\
1076.0&-15.8\\
1075.0&-15.13\\
1074.0&-15.13\\
1073.0&-16.29\\
1072.0&-16.29\\
1071.0&-15.92\\
1070.0&-15.92\\
1069.0&-17.05\\
1068.0&-17.28\\
1067.0&-15.62\\
1066.0&-15.62\\
1065.0&-18.0\\
1064.0&-18.0\\
1063.0&-15.54\\
1062.0&-17.88\\
1061.0&-17.88\\
1060.0&-17.88\\
1059.0&-20.46\\
1058.0&-18.59\\
1057.0&-18.59\\
1056.0&-18.64\\
1055.0&-18.64\\
1054.0&-18.22\\
1053.0&-18.42\\
1052.0&-18.42\\
1051.0&-18.42\\
1050.0&-18.42\\
1049.0&-18.55\\
1048.0&-18.55\\
1047.0&-19.2\\
1046.0&-19.2\\
1045.0&-17.26\\
1044.0&-17.65\\
1043.0&-17.65\\
1042.0&-17.82\\
1041.0&-17.82\\
1040.0&-18.58\\
1039.0&-18.58\\
1038.0&-19.94\\
1037.0&-19.8\\
1036.0&-19.8\\
1035.0&-19.56\\
1034.0&-19.56\\
1033.0&-19.56\\
1032.0&-17.75\\
1031.0&-17.6\\
1030.0&-17.6\\
1029.0&-17.6\\
1028.0&-17.47\\
1027.0&-17.47\\
1026.0&-17.54\\
1025.0&-17.54\\
1024.0&-19.77\\
1023.0&-19.77\\
1022.0&-17.73\\
1021.0&-17.73\\
1020.0&-17.73\\
1019.0&-15.1\\
1018.0&-16.96\\
1017.0&-16.96\\
1016.0&-17.08\\
1015.0&-17.08\\
1014.0&-18.27\\
1013.0&-18.27\\
1012.0&-18.27\\
1011.0&-17.44\\
1010.0&-18.22\\
1009.0&-18.22\\
1008.0&-18.22\\
1007.0&-18.38\\
1006.0&-18.85\\
1005.0&-18.85\\
1004.0&-19.45\\
1003.0&-19.1\\
1002.0&-19.1\\
1001.0&-17.16\\
1000.0&-17.16\\
999.0&-17.16\\
998.0&-15.65\\
997.0&-18.73\\
996.0&-18.73\\
995.0&-16.56\\
994.0&-16.56\\
993.0&-15.91\\
992.0&-15.91\\
991.0&-16.09\\
990.0&-16.09\\
989.0&-17.79\\
988.0&-17.79\\
987.0&-17.42\\
986.0&-17.42\\
985.0&-16.79\\
984.0&-16.79\\
983.0&-16.79\\
982.0&-17.4\\
981.0&-17.65\\
980.0&-17.65\\
979.0&-17.45\\
978.0&-17.45\\
977.0&-18.6\\
976.0&-18.6\\
975.0&-18.09\\
974.0&-18.09\\
973.0&-16.11\\
972.0&-16.11\\
971.0&-16.16\\
970.0&-17.85\\
969.0&-17.85\\
968.0&-18.2\\
967.0&-18.2\\
966.0&-16.77\\
965.0&-16.77\\
964.0&-17.67\\
963.0&-17.67\\
962.0&-17.69\\
961.0&-17.69\\
960.0&-17.07\\
959.0&-17.07\\
958.0&-17.69\\
957.0&-17.69\\
956.0&-17.69\\
955.0&-18.12\\
954.0&-18.12\\
953.0&-17.72\\
952.0&-17.72\\
951.0&-20.13\\
950.0&-20.13\\
949.0&-19.6\\
948.0&-19.6\\
947.0&-16.56\\
946.0&-16.56\\
945.0&-18.29\\
944.0&-18.29\\
943.0&-17.36\\
942.0&-17.36\\
941.0&-17.85\\
940.0&-17.85\\
939.0&-18.61\\
938.0&-18.61\\
937.0&-18.61\\
936.0&-18.4\\
935.0&-18.4\\
934.0&-16.88\\
933.0&-16.95\\
932.0&-16.95\\
931.0&-18.43\\
930.0&-18.43\\
929.0&-18.43\\
928.0&-17.23\\
927.0&-17.23\\
926.0&-17.77\\
925.0&-18.7\\
924.0&-18.7\\
923.0&-18.74\\
922.0&-18.74\\
921.0&-18.04\\
920.0&-18.04\\
919.0&-17.97\\
918.0&-17.97\\
917.0&-16.13\\
916.0&-16.13\\
915.0&-16.78\\
914.0&-16.78\\
913.0&-17.25\\
912.0&-17.35\\
911.0&-17.35\\
910.0&-17.62\\
909.0&-17.62\\
908.0&-18.07\\
907.0&-18.07\\
906.0&-19.03\\
905.0&-19.03\\
904.0&-17.93\\
903.0&-17.93\\
902.0&-17.93\\
901.0&-19.1\\
900.0&-19.1\\
899.0&-19.08\\
898.0&-19.08\\
897.0&-19.08\\
896.0&-17.85\\
895.0&-18.74\\
894.0&-18.74\\
893.0&-18.51\\
892.0&-17.27\\
891.0&-17.27\\
890.0&-17.27\\
889.0&-16.71\\
888.0&-18.7\\
887.0&-18.21\\
886.0&-18.21\\
885.0&-17.9\\
884.0&-17.9\\
883.0&-17.9\\
882.0&-17.62\\
881.0&-17.62\\
880.0&-18.6\\
879.0&-18.6\\
878.0&-17.01\\
877.0&-17.01\\
876.0&-16.95\\
875.0&-16.95\\
874.0&-16.95\\
873.0&-16.36\\
872.0&-16.36\\
871.0&-16.36\\
870.0&-18.46\\
869.0&-18.46\\
868.0&-19.01\\
867.0&-19.01\\
866.0&-18.22\\
865.0&-18.22\\
864.0&-18.25\\
863.0&-18.25\\
862.0&-18.25\\
861.0&-17.25\\
860.0&-17.25\\
859.0&-16.74\\
858.0&-16.74\\
857.0&-17.2\\
856.0&-17.2\\
855.0&-17.2\\
854.0&-18.56\\
853.0&-17.97\\
852.0&-17.97\\
851.0&-17.97\\
850.0&-17.97\\
849.0&-17.74\\
848.0&-17.74\\
847.0&-17.74\\
846.0&-17.62\\
845.0&-17.62\\
844.0&-17.62\\
843.0&-19.1\\
842.0&-19.1\\
841.0&-19.1\\
840.0&-17.32\\
839.0&-17.32\\
838.0&-17.32\\
837.0&-17.32\\
836.0&-17.49\\
835.0&-17.49\\
834.0&-17.49\\
833.0&-19.35\\
832.0&-19.35\\
831.0&-19.35\\
830.0&-17.87\\
829.0&-17.92\\
828.0&-17.92\\
827.0&-17.92\\
826.0&-17.92\\
825.0&-16.72\\
824.0&-16.72\\
823.0&-16.72\\
822.0&-15.34\\
821.0&-15.34\\
820.0&-17.64\\
819.0&-17.64\\
818.0&-17.86\\
817.0&-17.86\\
816.0&-17.86\\
815.0&-17.86\\
814.0&-16.23\\
813.0&-16.23\\
812.0&-17.77\\
811.0&-17.77\\
810.0&-17.77\\
809.0&-17.77\\
808.0&-17.06\\
807.0&-17.06\\
806.0&-17.06\\
805.0&-17.02\\
804.0&-17.02\\
803.0&-17.02\\
802.0&-16.47\\
801.0&-16.47\\
800.0&-16.47\\
799.0&-17.45\\
798.0&-17.45\\
797.0&-17.77\\
796.0&-17.77\\
795.0&-16.92\\
794.0&-16.92\\
793.0&-16.92\\
792.0&-18.06\\
791.0&-18.06\\
790.0&-18.06\\
789.0&-18.67\\
788.0&-18.67\\
787.0&-18.67\\
786.0&-16.97\\
785.0&-16.97\\
784.0&-18.1\\
783.0&-18.1\\
782.0&-18.1\\
781.0&-19.99\\
780.0&-19.99\\
779.0&-18.9\\
778.0&-18.9\\
777.0&-17.88\\
776.0&-17.88\\
775.0&-17.03\\
774.0&-17.03\\
773.0&-17.03\\
772.0&-17.03\\
771.0&-17.75\\
770.0&-17.75\\
769.0&-17.75\\
768.0&-16.94\\
767.0&-16.94\\
766.0&-16.94\\
765.0&-15.76\\
764.0&-15.76\\
763.0&-15.76\\
762.0&-15.76\\
761.0&-17.27\\
760.0&-17.27\\
759.0&-18.37\\
758.0&-18.37\\
757.0&-18.37\\
756.0&-18.37\\
755.0&-18.38\\
754.0&-18.38\\
753.0&-18.38\\
752.0&-17.84\\
751.0&-17.84\\
750.0&-17.84\\
749.0&-18.16\\
748.0&-18.16\\
747.0&-18.16\\
746.0&-18.16\\
\end{tabular}
